)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3

]^{-2})c

) [(GeV/ yd_Tp/(d

N^2) d Tpπ 1/(2 evN 1/

-3 10 -2 10 -1 10 1 10 210 310 410 510 610 π

Range of combined fit

0-5%

80-90% positive negative combined fit individual fit

(a)